Virtual Tour

External Panorama

Explore the museum from the comfort of your armchair by exploring this virtual tour consisting of full 360 degree panoramas of the Museum’s public spaces, photographed in 2003. They are part of a series available from the Virtual Tour of Oxford, hosted by the University’s Department of Chemistry.

Note These panoramas require the installation of Apple QuickTime Player.

Top Gallery and upper stairs

Entrance Gallery and lower stairs

Basement Gallery

Contents